From 36a8589204d5001ae115517e6af43135cda96664 Mon Sep 17 00:00:00 2001
From: marcinzelent <zelent.marcin@gmail.com>
Date: Sat, 19 May 2018 18:32:30 +0200
Subject: Finished OWASP Top 10 summary and fixed some errors

---
 synopsis.tex | 9 +++++++--
 1 file changed, 7 insertions(+), 2 deletions(-)

(limited to 'synopsis.tex')

diff --git a/synopsis.tex b/synopsis.tex
index a803351..2769754 100644
--- a/synopsis.tex
+++ b/synopsis.tex
@@ -258,7 +258,11 @@ critical web application security risks:
 		A weakness in one component could lead to compromisitation of
 		the whole system. Application is just as secure its weakest
 		link.
-	\item \textbf{A10:2017 - Insufficient Logging & Monitoring}
+	\item \textbf{A10:2017 - Insufficient Logging \& Monitoring}
+		Application needs to log what is happening inside it and its
+		status needs to be monitored so, in case of a breach,
+		the administrators could detect it, find a cause of it and fix
+		the weakness.
 
 \end{itemize}
 
@@ -278,7 +282,8 @@ critical web application security risks:
 		The OWASP Foundation
 		\textit{OWASP Top 10 - 2017 (The Ten Most Critical Web
 		Application Security Risk)}
-		\texttt{https://www.owasp.org/images/7/72/OWASP_Top_10-2017_%28en%29.pdf.pdf}
+		\texttt{https://www.owasp.org/images/7/72/
+		OWASP\_Top\_10-2017\_(en).pdf.pdf}
 
 	\bibitem{lyndaowasptop10}
 		Caroline Wong.
-- 
cgit v1.2.3

