From 5ee049db8c978cb9f7fac4a47c5638d9ef2893c7 Mon Sep 17 00:00:00 2001
From: Marcin Zelent <zelent.marcin@gmail.com>
Date: Thu, 17 May 2018 14:02:21 +0200
Subject: Started writing about OWASP Top 10

---
 synopsis.tex | 9 +++++++++
 1 file changed, 9 insertions(+)

(limited to 'synopsis.tex')

diff --git a/synopsis.tex b/synopsis.tex
index 8d49de1..d6b781d 100644
--- a/synopsis.tex
+++ b/synopsis.tex
@@ -201,6 +201,15 @@ usually it is also connected to the network. Finally, the attacker could use the
 functionality of the compromised IoT devices in a bad way, for example making
 them use a lot of power, causing short circuit or even starting fire.
 
+\subsection{Most common application security vulnerabilities}
+
+There are many possible weaknesses but some of them occur more often than the
+rest. A non-profit organization called Open Web Application Security Project
+(or just OWASP for short), which mission is to make software more secure,
+publishes a compilation of these vulnerabilities every 3 years in a document
+titled \textit{OWASP Top 10 - The Ten Most Critical Web Application Security
+Risks}.
+
 \section{Conclusion}
 
 \section{Reflection}
-- 
cgit v1.2.3

